\chapter{A robust, fully automated algorithm to collect high quality OPA tuning curves}

\textit{Principle design features of the new EVV 2DIR optical delivery system include the
  following: ... Pairs of motorized gimbal mount mirrors on each OPA to compensate beam pointing
  changes ... Automated calibration of OPAs, delay stages and motorized mounts.
  ---\textcite{DonaldsonPaulMurray2007a}}  % page 313

This chapter pasted from publication...

% DONALDSON HAS AUTOMATED OPA TUNING DOWN?