From 676aee888e5dc94ba1cc05de869845f4c280c665 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Mon, 27 Nov 2017 22:33:32 -0600
Subject: errata

---
 errata/chapter.tex | 25 +++++++++++++++++++++++++
 1 file changed, 25 insertions(+)
 create mode 100644 errata/chapter.tex

(limited to 'errata/chapter.tex')

diff --git a/errata/chapter.tex b/errata/chapter.tex
new file mode 100644
index 0000000..159c713
--- /dev/null
+++ b/errata/chapter.tex
@@ -0,0 +1,25 @@
+\chapter{Errata}
+
+In this appendix I list the errors I am currently aware of in my publications and associated
+work.  %
+
+\section{Czech 2015}  % ---------------------------------------------------------------------------
+
+The following is an errata for \textcite{CzechKyleJonathan2015a}, published in November 2015.
+
+\begin{itemize}
+  \item Reference 13 is identical to reference 9.
+  \item In the last paragraph of the introduction the sentence ``The experimental spectra differ
+    from the simple 2D spectrum shown in Figure 1d and those of earlier CMDS experiments with model
+    systems'' appears. This sentence cites references 6 through 10. Instead, it should cite
+    references 15 through 20.
+  \item In the last paragraph begining on page 12148, the text ``Automated delay stages and neutral
+    density filters set the excitation time delays over all values of $\tau_{21}$ with
+    $\tau_{22}=0$''    appears. For the second $\tau$, the subscript should read $22^\prime$, not
+    $22$.
+  \item Caption of Figure 5 reads, in part: "showing the impact of the $\omega_1$ excitation
+    frequency on the $\omega_1$ spectral line shape". This should instead read "showing the impact
+    of the $\omega_1$ excitation frequency on the $\omega_2$ spectral line shape". The subscript on
+    the last $\omega$ should be a 2 and not a 1.
+  \item Figure 6 e$^\prime$+e,e$^\prime$ should read e$^\prime$+e,e and vice versa.
+\end{itemize}
\ No newline at end of file
-- 
cgit v1.2.3

