\chapter{A robust, fully automated algorithm to collect high quality OPA tuning curves}

\begin{dquote}
  Principle design features of the new EVV 2DIR optical delivery system include the following:
  \begin{ditemize}
    \item Pairs of motorized gimbal mount mirrors on each OPA to compensate beam pointing changes.
    \item Automated calibration of OPAs, delay stages and motorized mounts.
  \end{ditemize}
      
  \dsignature{Paul Donaldson, ``Improving ... EVV 2DIR Spectroscopy'' (2007)
    \cite{DonaldsonPaulMurray2007a}}  % appears on page 313
\end{dquote}

\clearpage

This chapter pasted from publication...

% DONALDSON HAS AUTOMATED OPA TUNING DOWN?