From b6d88e014f454e040a96d6f1342cefff0c99f061 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Thu, 26 Apr 2018 10:51:26 -0500
Subject: 2018-04-26 10:51

---
 opa_phase/chapter.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'opa_phase/chapter.tex')

diff --git a/opa_phase/chapter.tex b/opa_phase/chapter.tex
index ae1a9ea..6fef62f 100644
--- a/opa_phase/chapter.tex
+++ b/opa_phase/chapter.tex
@@ -7,7 +7,7 @@ This makes interference processes quickly average to zero over many shots---we r
 than 100 shots per pixel.  %
 Here I demonstrate that this assumption is very poor, at least for the femtosecond OPAs.  %
 
-In these experiments, I simply send OPA1 and OPA2 simultaniously into the array detector.  %
+In these experiments, I simply send OPA1 and OPA2 simultaneously into the array detector.  %
 The crucial detail is that the beams are exactly collinear---overlaped in a beamsplitter.  %
 I then scan delay between them while collecting single shot spectra using the array detector.  %
 
-- 
cgit v1.2.3

