From 6579cbe6381ee4bb805a6d5b5cc5fbd249daa9f2 Mon Sep 17 00:00:00 2001
From: Blaise Thompson <blaise@untzag.com>
Date: Mon, 16 Apr 2018 09:35:25 -0500
Subject: 2018-04-16 09:35

---
 PEDOT_PSS/chapter.tex | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'PEDOT_PSS/chapter.tex')

diff --git a/PEDOT_PSS/chapter.tex b/PEDOT_PSS/chapter.tex
index d932787..a0ef8e3 100644
--- a/PEDOT_PSS/chapter.tex
+++ b/PEDOT_PSS/chapter.tex
@@ -37,14 +37,14 @@ even more structural inhomogeneity.
 In summary, PEDOT:PSS has a complex, nested microstructure.  %
 From smallest to largest:
 \begin{ditemize}
-  \item PEDOT oligomers (6---18-mers) [CITE 14]
+  \item PEDOT oligomers (6---18-mers) % [CITE 14]
   \item these oligomers $\pi$-stack to form small nanocrystalites, 3 to 14 oligomers for pristine
-    films to as many as 13---14 oligomers for more conductive solvent treated films [CITE 15]
+    films to as many as 13---14 oligomers for more conductive solvent treated films % [CITE 15]
   \item nanocrystallites then arrange into globular conductive particles in a pancake-like shape
-    [CITE 16, 17]
+   %   [CITE 16, 17]
   \item these particles themselves are then linked via PSS-rich domains and assembled into
-    nanofibril geometry akin to a string of pearls [CITE 6, 21]
-  \item nanofibrils interweave to form thin films, with PSS capping layer at surface [CITE 19, 22]
+    nanofibril geometry akin to a string of pearls  %[CITE 6, 21]
+  \item nanofibrils interweave to form thin films, with PSS capping layer at surface %[CITE 19, 22]
 \end{ditemize}
 
 In order to be conductive, PEDOT:PSS needs to have good spatial and energetic overlap between
-- 
cgit v1.2.3

